0 0 88.1

0 0 88.32

94.3 85.2 3.76

90.6 83 3.56

9.4 5.8 9.23

86.8 87.3 2.65

79.2 84.2 2.62

69.4 70.4 3.07

0 0 87.87

80 84.2 1.26

82.1 80.7 2.45

88.5 85.7 2.53

84.6 80.7 3.68

87.3 89.3 1.57

77.6 76.9 2.31

0 0 87.44

100 91.7 1.56

0 0 88.36

0 0 88.38

0 0 83.66

0 0 88.46

0 0 89.43

0 0 89.03

91.7 78.3 1.57

0 0 88.04

0 0 88.42

0 0 88.6

0 0 88.1

0 0 88.22

0 0 88.35

63.6 78.3 2.41

0 0 88.53

0 0 88.67

0 0 84

0 0 88.85

0 0 89.8

0 0 89.38

91.7 78.3 2.48

0

20

40

60

80

100

0 10 20 30 40 50 60 70 80 90 100

Sequence identity (%)

RMS (Å)

0

1

2

3

4

0 10 20 30 40 50 60 70 80 90 100

Sequence identity (%)

(a)

0

20

40

60

80

100

0 10 20 30 40 50 60 70 80 90 100

Sequence identity (%)

0

1

2

3

4

0 10 20 30 40 50 60 70 80 90 100

Sequence identity (%)

(b)

Figure 9