0.0 0.5 1.0 1.5 2.0 2.5 0.0

1.0

2.0

3.0

RMSD_{core,NCαCO}(stem,NCαCO) [Å]

<RMSDloop,NCαCO(loop,NCαCO)> [Å]

(a) .