0.0 0.4 0.8 1.2 1.6 2.0 2.4 2.8 3.2

0.00

0.20

0.40

0.60

0.80

1.00

RMSDloop,NCαCO(loop,NCαCO) [Å]

% correct conformation class r = -0.82

(e)